; MSC_TRD.def : Declares the module parameters.

LIBRARY      "MSC_TRD.DLL"

EXPORTS
	MSC_TRD0		@1
	MSC_TRD1		@2
	MSC_TRD2		@3
	MSC_TRD3		@4
	MSC_TRD4		@5
